-14.927 -14.926 -14.925 -14.924 μ / pN

P(μ) μ = -14.93 ± 0.00 pN

0.12 0.121 0.122 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

300 350 400 450 τ / ms

P(τ) τ = 363.54 ± 14.79 ms

-13.84 -13.835 -13.83 μ / pN μ = -13.84 ± 0.00 pN

0.128 0.13 0.132 σ / pN σ = 0.13 ± 0.00 pN

60 80 100 τ / ms τ = 80.63 ± 3.20 ms