-14.7 -14.698 -14.696 μ / pN

P(μ) μ = -14.70 ± 0.00 pN

0.145 0.146 0.147 σ / pN

P(σ) σ = 0.15 ± 0.00 pN

500 600 700 800 τ / ms

P(τ) τ = 636.28 ± 29.68 ms

-13.63 -13.62 -13.61 μ / pN μ = -13.62 ± 0.00 pN

0.16 0.165 0.17 σ / pN σ = 0.16 ± 0.00 pN

60 70 80 90 τ / ms τ = 73.22 ± 3.46 ms