-14.512 -14.51 -14.508 μ / pN

P(μ) μ = -14.51 ± 0.00 pN

0.136 0.138 0.14 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

800 1000 1200 1400 τ / ms

P(τ) τ = 1125.38± 75.24 ms

-13.43 -13.42 -13.41 μ / pN μ = -13.42 ± 0.00 pN

0.145 0.15 0.155 σ / pN σ = 0.15 ± 0.00 pN

30 40 50 60 τ / ms τ = 46.30 ± 3.01 ms