-15.46 -15.455 -15.45 μ / pN

P(μ) μ = -15.46 ± 0.00 pN

0.138 0.14 0.142 0.144 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

100 120 140 160 τ / ms

P(τ) τ = 124.28 ± 6.31 ms

-14.336 -14.334 -14.332 μ / pN μ = -14.33 ± 0.00 pN

0.136 0.138 0.14 σ / pN σ = 0.14 ± 0.00 pN

200 250 300 350 τ / ms τ = 256.13 ± 13.06 ms