-15.655 -15.65 -15.645 μ / pN

P(μ) μ = -15.65 ± 0.00 pN

0.145 0.15 0.155 σ / pN

P(σ) σ = 0.15 ± 0.00 pN

40 60 80 100 τ / ms

P(τ) τ = 67.93 ± 3.47 ms

-14.556 -14.554 -14.552 μ / pN μ = -14.55 ± 0.00 pN

0.138 0.139 0.14 0.141 σ / pN σ = 0.14 ± 0.00 pN

300 400 500 600 τ / ms τ = 439.09 ± 22.68 ms