-15.244 -15.242 -15.24 μ / pN

P(μ) μ = -15.24 ± 0.00 pN

0.11 0.112 0.114 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

600 800 1000 τ / ms

P(τ) τ = 795.82 ± 53.59 ms

-14.054 -14.052 -14.05 μ / pN μ = -14.05 ± 0.00 pN

0.11 0.115 0.12 σ / pN σ = 0.12 ± 0.00 pN

150 200 250 τ / ms τ = 189.00 ± 12.74 ms