-15.452 -15.45 -15.448 μ / pN

P(μ) μ = -15.45 ± 0.00 pN

0.121 0.122 0.123 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

300 400 500 600 τ / ms

P(τ) τ = 414.14 ± 25.79 ms

-14.25 -14.248 -14.246 μ / pN μ = -14.25 ± 0.00 pN

0.12 0.122 0.124 σ / pN σ = 0.12 ± 0.00 pN

200 300 400 τ / ms τ = 296.33 ± 17.84 ms