-15.65 -15.648 -15.646 μ / pN

P(μ) μ = -15.65 ± 0.00 pN

0.131 0.132 0.133 0.134 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

150 200 250 300 τ / ms

P(τ) τ = 230.78 ± 11.40 ms

-14.46 -14.458 -14.456 μ / pN μ = -14.46 ± 0.00 pN

0.12 0.122 0.124 σ / pN σ = 0.12 ± 0.00 pN

400 500 600 τ / ms τ = 470.29 ± 23.46 ms