-15.86 -15.855 -15.85 μ / pN

P(μ) μ = -15.86 ± 0.00 pN

0.126 0.128 0.13 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

100 120 140 160 τ / ms

P(τ) τ = 124.37 ± 6.12 ms

-14.687 -14.686 -14.685 μ / pN μ = -14.69 ± 0.00 pN

0.121 0.122 0.123 σ / pN σ = 0.12 ± 0.00 pN

800 900 1000 1100 τ / ms τ = 917.82 ± 45.14 ms