-16.14 -16.135 -16.13 μ / pN

P(μ) μ = -16.14 ± 0.00 pN

0.115 0.12 0.125 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

80 100 120 140 τ / ms

P(τ) τ = 108.48 ± 6.06 ms

-14.935 -14.934 -14.933 μ / pN μ = -14.93 ± 0.00 pN

0.103 0.104 0.105 σ / pN σ = 0.10 ± 0.00 pN

800 1000 1200 1400 τ / ms τ = 1125.86± 61.12 ms