-15.075 -15.07 -15.065 μ / pN

P(μ) μ = -15.07 ± 0.00 pN

0.106 0.108 0.11 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

500 1000 1500 τ / ms

P(τ) τ = 1009.40± 119.30 ms

-13.895 -13.89 -13.885 μ / pN μ = -13.89 ± 0.00 pN

0.11 0.115 0.12 σ / pN σ = 0.12 ± 0.00 pN

100 150 200 250 τ / ms τ = 148.25 ± 18.58 ms