-14.07 -14.068 -14.066 μ / pN

P(μ) μ = -14.07 ± 0.00 pN

0.136 0.138 0.14 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

250 300 350 400 τ / ms

P(τ) τ = 306.07 ± 17.04 ms

-13.005 -13 -12.995 μ / pN μ = -13.00 ± 0.00 pN

0.164 0.166 0.168 σ / pN σ = 0.17 ± 0.00 pN

300 400 500 τ / ms τ = 393.80 ± 21.72 ms