-14.25 -14.245 -14.24 μ / pN

P(μ) μ = -14.25 ± 0.00 pN

0.140.1420.1440.1460.1480.15 σ / pN

P(σ) σ = 0.15 ± 0.00 pN

150 200 250 τ / ms

P(τ) τ = 191.77 ± 10.40 ms

-13.178 -13.176 -13.174 μ / pN μ = -13.18 ± 0.00 pN

0.166 0.168 0.17 σ / pN σ = 0.17 ± 0.00 pN

400 500 600 700 τ / ms τ = 543.62 ± 29.00 ms