-14.525 -14.52 -14.515 μ / pN

P(μ) μ = -14.52 ± 0.00 pN

0.138 0.14 0.142 0.144 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

100 150 200 τ / ms

P(τ) τ = 160.00 ± 9.69 ms

-13.444 -13.443 -13.442 -13.441 μ / pN μ = -13.44 ± 0.00 pN

0.157 0.158 0.159 σ / pN σ = 0.16 ± 0.00 pN

1000 1500 2000 τ / ms τ = 1320.22± 83.95 ms