-14.52 -14.51 -14.5 -14.49 μ / pN

P(μ) μ = -14.51 ± 0.00 pN

0.32 0.33 0.34 0.35 σ / pN

P(σ) σ = 0.33 ± 0.00 pN

50 100 150 τ / ms

P(τ) τ = 78.70 ± 7.11 ms

-13.66 -13.658 -13.656 μ / pN μ = -13.66 ± 0.00 pN

0.156 0.158 0.16 σ / pN σ = 0.16 ± 0.00 pN

1500 2000 2500 3000 τ / ms τ = 2018.51± 185.38 ms