-15.612 -15.61 -15.608 μ / pN

P(μ) μ = -15.61 ± 0.00 pN

0.11 0.112 0.114 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

300 400 500 τ / ms

P(τ) τ = 399.75 ± 23.85 ms

-14.43 -14.425 -14.42 μ / pN μ = -14.43 ± 0.00 pN

0.134 0.136 0.138 0.14 σ / pN σ = 0.14 ± 0.00 pN

100 150 200 τ / ms τ = 157.67 ± 9.37 ms