-15.925 -15.92 -15.915 μ / pN

P(μ) μ = -15.92 ± 0.00 pN

0.124 0.126 0.128 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

140 160 180 200 τ / ms

P(τ) τ = 164.27 ± 9.16 ms

-14.732 -14.73 -14.728 μ / pN μ = -14.73 ± 0.00 pN

0.12 0.122 0.124 σ / pN σ = 0.12 ± 0.00 pN

300 400 500 τ / ms τ = 373.09 ± 19.18 ms