-16.1 -16.095 -16.09 -16.085 μ / pN

P(μ) μ = -16.10 ± 0.00 pN

0.115 0.12 0.125 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

60 80 100 120 τ / ms

P(τ) τ = 95.98 ± 5.70 ms

-14.936 -14.934 -14.932 μ / pN μ = -14.93 ± 0.00 pN

0.112 0.113 0.114 σ / pN σ = 0.11 ± 0.00 pN

400 500 600 700 τ / ms τ = 587.83 ± 36.21 ms