-16.325 -16.32 -16.315 μ / pN

P(μ) μ = -16.32 ± 0.00 pN

0.118 0.12 0.122 0.124 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

60 80 100 τ / ms

P(τ) τ = 80.80 ± 3.86 ms

-15.126 -15.125 -15.124 μ / pN μ = -15.12 ± 0.00 pN

0.11 0.111 0.112 σ / pN σ = 0.11 ± 0.00 pN

600 700 800 900 τ / ms τ = 741.79 ± 36.66 ms