-16.52 -16.51 -16.5 μ / pN

P(μ) μ = -16.51 ± 0.00 pN

0.12 0.13 0.14 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

30 40 50 τ / ms

P(τ) τ = 40.85 ± 2.36 ms

-15.357 -15.356 -15.355 μ / pN μ = -15.36 ± 0.00 pN

0.1125 0.113 0.1135 0.114 σ / pN σ = 0.11 ± 0.00 pN

1000 1500 2000 τ / ms τ = 1509.03± 93.90 ms