-15.506 -15.504 -15.502 μ / pN

P(μ) μ = -15.50 ± 0.00 pN

0.122 0.124 0.126 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

250 300 350 400 τ / ms

P(τ) τ = 339.89 ± 16.22 ms

-14.334 -14.332 -14.33 μ / pN μ = -14.33 ± 0.00 pN

0.136 0.138 0.14 σ / pN σ = 0.14 ± 0.00 pN

150 200 250 300 τ / ms τ = 212.57 ± 10.65 ms