-15.276 -15.274 -15.272 μ / pN

P(μ) μ = -15.27 ± 0.00 pN

0.113 0.114 0.115 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

500 1000 1500 τ / ms

P(τ) τ = 1000.49± 62.76 ms

-14.08 -14.075 -14.07 μ / pN μ = -14.08 ± 0.00 pN

0.12 0.125 0.13 σ / pN σ = 0.13 ± 0.00 pN

80 100 120 140 τ / ms τ = 113.08 ± 6.91 ms