-14.994 -14.993 -14.992 μ / pN

P(μ) μ = -14.99 ± 0.00 pN

0.104 0.105 0.106 σ / pN

P(σ) σ = 0.10 ± 0.00 pN

1000 1500 2000 τ / ms

P(τ) τ = 1519.79± 93.58 ms

-13.81 -13.805 -13.8 μ / pN μ = -13.81 ± 0.00 pN

0.115 0.12 0.125 σ / pN σ = 0.12 ± 0.00 pN

60 80 100 τ / ms τ = 78.52 ± 5.11 ms