-15.388 -15.386 -15.384 μ / pN

P(μ) μ = -15.39 ± 0.00 pN

0.124 0.126 0.128 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

200 250 300 τ / ms

P(τ) τ = 246.37 ± 10.98 ms

-14.178 -14.176 -14.174 μ / pN μ = -14.18 ± 0.00 pN

0.13 0.132 0.134 0.136 σ / pN σ = 0.13 ± 0.00 pN

80 100 120 τ / ms τ = 100.73 ± 4.64 ms