-15.608 -15.606 -15.604 μ / pN

P(μ) μ = -15.61 ± 0.00 pN

0.14 0.142 0.144 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

100 120 140 160 τ / ms

P(τ) τ = 133.40 ± 5.42 ms

-14.42 -14.415 -14.41 μ / pN μ = -14.41 ± 0.00 pN

0.136 0.138 0.14 σ / pN σ = 0.14 ± 0.00 pN

150 200 250 τ / ms τ = 176.92 ± 7.60 ms