-16.015 -16.01 -16.005 -16 μ / pN

P(μ) μ = -16.01 ± 0.00 pN

0.13 0.135 0.14 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

40 50 60 τ / ms

P(τ) τ = 50.76 ± 2.47 ms

-14.81 -14.809 -14.808 -14.807 μ / pN μ = -14.81 ± 0.00 pN

0.114 0.115 0.116 0.117 σ / pN σ = 0.12 ± 0.00 pN

300 400 500 600 τ / ms τ = 451.36 ± 22.43 ms