-15.795 -15.79 -15.785 μ / pN

P(μ) μ = -15.79 ± 0.00 pN

0.13 0.135 0.14 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

50 60 70 80 τ / ms

P(τ) τ = 67.89 ± 3.04 ms

-14.602 -14.6 -14.598 μ / pN μ = -14.60 ± 0.00 pN

0.124 0.125 0.126 0.127 σ / pN σ = 0.12 ± 0.00 pN

250 300 350 400 τ / ms τ = 346.16 ± 15.72 ms