-16.18 -16.17 -16.16 μ / pN

P(μ) μ = -16.17 ± 0.00 pN

0.13 0.14 0.15 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

30 40 50 60 τ / ms

P(τ) τ = 41.92 ± 2.44 ms

-14.982 -14.98 -14.978 μ / pN μ = -14.98 ± 0.00 pN

0.112 0.114 0.116 σ / pN σ = 0.11 ± 0.00 pN

400 600 800 1000 τ / ms τ = 642.22 ± 41.61 ms