-16.36 -16.34 -16.32 μ / pN

P(μ) μ = -16.33 ± 0.00 pN

0.145 0.15 0.155 0.16 σ / pN

P(σ) σ = 0.15 ± 0.00 pN

10 20 30 40 τ / ms

P(τ) τ = 24.21 ± 1.86 ms

-15.16 -15.159 -15.158 -15.157 μ / pN μ = -15.16 ± 0.00 pN

0.111 0.112 0.113 0.114 σ / pN σ = 0.11 ± 0.00 pN

800 1000 1200 1400 τ / ms τ = 1032.01± 80.90 ms