-15.198 -15.196 -15.194 μ / pN

P(μ) μ = -15.20 ± 0.00 pN

0.118 0.12 0.122 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

200 300 400 τ / ms

P(τ) τ = 287.79 ± 16.40 ms

-14.005 -14 -13.995 μ / pN μ = -14.00 ± 0.00 pN

0.12 0.125 0.13 σ / pN σ = 0.13 ± 0.00 pN

80 100 120 140 τ / ms τ = 101.16 ± 5.67 ms