-15.008 -15.006 -15.004 μ / pN

P(μ) μ = -15.01 ± 0.00 pN

0.118 0.119 0.12 0.121 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

300 400 500 τ / ms

P(τ) τ = 402.23 ± 18.37 ms

-13.815 -13.81 -13.805 μ / pN μ = -13.81 ± 0.00 pN

0.125 0.13 0.135 σ / pN σ = 0.13 ± 0.00 pN

60 70 80 90 τ / ms τ = 72.75 ± 3.42 ms