-14.786 -14.784 -14.782 μ / pN

P(μ) μ = -14.78 ± 0.00 pN

0.114 0.116 0.118 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

400 600 800 1000 τ / ms

P(τ) τ = 655.71 ± 42.19 ms

-13.61 -13.6 -13.59 μ / pN μ = -13.60 ± 0.00 pN

0.13 0.135 0.14 0.145 σ / pN σ = 0.13 ± 0.00 pN

40 60 80 τ / ms τ = 54.71 ± 3.82 ms