-14.756 -14.754 -14.752 μ / pN

P(μ) μ = -14.75 ± 0.00 pN

0.136 0.138 0.14 σ / pN

P(σ) σ = 0.14 ± 0.00 pN

250 300 350 400 τ / ms

P(τ) τ = 326.12 ± 15.60 ms

-13.71 -13.705 -13.7 μ / pN μ = -13.70 ± 0.00 pN

0.13 0.132 0.134 0.136 σ / pN σ = 0.13 ± 0.00 pN

80 100 120 τ / ms τ = 100.48 ± 4.92 ms