-15.16 -15.155 -15.15 μ / pN

P(μ) μ = -15.15 ± 0.00 pN

0.128 0.13 0.132 0.134 σ / pN

P(σ) σ = 0.13 ± 0.00 pN

60 80 100 120 τ / ms

P(τ) τ = 88.38 ± 3.86 ms

-14.096 -14.094 -14.092 μ / pN μ = -14.09 ± 0.00 pN

0.128 0.13 0.132 σ / pN σ = 0.13 ± 0.00 pN

200 250 300 τ / ms τ = 234.49 ± 10.58 ms