-15.43 -15.425 -15.42 μ / pN

P(μ) μ = -15.43 ± 0.00 pN

0.115 0.12 0.125 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

40 50 60 τ / ms

P(τ) τ = 49.42 ± 2.67 ms

-14.364 -14.362 -14.36 μ / pN μ = -14.36 ± 0.00 pN

0.116 0.117 0.118 σ / pN σ = 0.12 ± 0.00 pN

350 400 450 500 τ / ms τ = 426.22 ± 23.39 ms