-15.615 -15.61 -15.605 μ / pN

P(μ) μ = -15.61 ± 0.00 pN

0.11 0.115 0.12 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

30 40 50 60 τ / ms

P(τ) τ = 43.33 ± 2.15 ms

-14.532 -14.531 -14.53 μ / pN μ = -14.53 ± 0.00 pN

0.101 0.102 0.103 σ / pN σ = 0.10 ± 0.00 pN

400 500 600 700 τ / ms τ = 531.94 ± 27.77 ms