-15.82 -15.81 -15.8 -15.79 μ / pN

P(μ) μ = -15.81 ± 0.00 pN

0.115 0.12 0.125 0.13 σ / pN

P(σ) σ = 0.12 ± 0.00 pN

10 20 30 40 τ / ms

P(τ) τ = 25.08 ± 1.55 ms

-14.754 -14.752 -14.75 μ / pN μ = -14.75 ± 0.00 pN

0.106 0.107 0.108 σ / pN σ = 0.11 ± 0.00 pN

800 1000 1200 1400 τ / ms τ = 1104.24± 71.92 ms