-14.604 -14.602 -14.6 μ / pN

P(μ) μ = -14.60 ± 0.00 pN

0.11 0.111 0.112 0.113 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

250 300 350 400 τ / ms

P(τ) τ = 333.45 ± 16.61 ms

-13.545 -13.54 -13.535 μ / pN μ = -13.54 ± 0.00 pN

0.114 0.116 0.118 0.12 σ / pN σ = 0.12 ± 0.00 pN

70 80 90 100 τ / ms τ = 85.62 ± 4.00 ms