-14.383 -14.382 -14.381 -14.38 μ / pN

P(μ) μ = -14.38 ± 0.00 pN

0.106 0.107 0.108 σ / pN

P(σ) σ = 0.11 ± 0.00 pN

400 500 600 700 τ / ms

P(τ) τ = 528.90 ± 23.72 ms

-13.32 -13.315 -13.31 μ / pN μ = -13.32 ± 0.00 pN

0.115 0.12 0.125 σ / pN σ = 0.12 ± 0.00 pN

50 60 70 80 τ / ms τ = 61.28 ± 2.73 ms