-14.18 -14.179 -14.178 μ / pN

P(μ) μ = -14.18 ± 0.00 pN

0.096 0.097 0.098 σ / pN

P(σ) σ = 0.10 ± 0.00 pN

800 1000 1200 1400 τ / ms

P(τ) τ = 1039.54± 51.96 ms

-13.125 -13.12 -13.115 μ / pN μ = -13.12 ± 0.00 pN

0.115 0.12 0.125 σ / pN σ = 0.12 ± 0.00 pN

35 40 45 50 τ / ms τ = 40.80 ± 2.02 ms